EISCAT SVALBARD RADAR

SS-520-2, 32m, tau0, December 03, 2000

Produced at EISCAT Longyearbyen, 04-Dec-2000 Not for publication - see Rules-of-the-road

04:00 05:00 06:00 07:00 08:00 09:00 10:00 11:00 100

200

300

400

500

600

Electron Density (Log10)

Altitude (km)

10.2

10.4

10.6

10.8 11 11.2

11.4

11.6

04:00 05:00 06:00 07:00 08:00 09:00 10:00 11:00 100

200

300

400

500

600

Electron Temperature (K)

0

1000

2000

3000

4000

04:00 05:00 06:00 07:00 08:00 09:00 10:00 11:00 100

200

300

400

500

600

Ion Temperature (K)

0 500 1000

1500

2000

2500

3000

04:00 05:00 06:00 07:00 08:00 09:00 10:00 11:00 100

200

300

400

500

600

Ion Velocity (m/s)

(positive away)

UNIVERSAL TIME

-500

0

500